2300. 2450. 2600. 2750.

s (m)

FFS with L*=3.5m

0.0 50. 100.

150.

200.

250.

300.

βx (m), βy (m) [*10**( 3)]

-0.045

-0.040

-0.035

-0.030

-0.025

-0.020

-0.015

-0.010

-0.005 0.0 0.005

0.010

Dx (m)

β x β y Dx