0.0 100. 200. 300. 400. 500. 600.

s (m)

End of Linac - Diagnostics section

0.0 35. 70. 105.

140.

175.

210.

245.

280.

315.

350.

βx (m), βy (m)

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

Dx (m)

β x β y Dx