0.0 1500. 3000. 4500.

s (m)

Linear Collimation + L*:= 4.3 m, Bx*:= 0.7 cm, By*:= 0.09 mm

0.0 100.

200.

300.

400.

500.

600.

βx (m), βy (m) [*10**( 3)]

-0.10

-0.05 0.0 0.05

0.10

0.15

0.20

0.25

0.30

0.35

0.40

0.45

Dx (m)

β x β y Dx